Gain amp vs UTC time for NRAO150.MULTI.1 SN 2 Lpol IF 1

Plot file version 1 created 12-AUG-2003 18:58:37

1L MC

1100

1000 900 2L ON

1200 1150 1100 1050

3L MH

1250 1200 1150 1100 1050

6L NT

MilliGain

TIME (HOURS)

12 14 16 18 20 22 1/00

1250 1200 1150 1100 1050

Gain amp vs UTC time for NRAO150.MULTI.1 SN 2 Lpol IF 2

Plot file version 2 created 12-AUG-2003 18:58:38

1L MC

1100 1000 900 2L ON

1050 1000 950 900 850 3L MH

1400 1300 1200

6L NT

MilliGain

TIME (HOURS)

12 14 16 18 20 22 1/00

1100

1000 900

Gain amp vs UTC time for NRAO150.MULTI.1 SN 2 Lpol IF 3

Plot file version 3 created 12-AUG-2003 18:58:38

1L MC

1000 950 900 2L ON

1150 1100 1050 1000 3L MH

1200 1100 1000 6L NT

MilliGain

TIME (HOURS)

12 14 16 18 20 22 1/00

1000 950 900 850

Gain amp vs UTC time for NRAO150.MULTI.1 SN 2 Lpol IF 4

Plot file version 4 created 12-AUG-2003 18:58:38

1L MC

1100 1050 1000 950 2L ON

1100 1050 1000 950 3L MH

1250 1200 1150 1100 1050 6L NT

MilliGain

TIME (HOURS)

12 14 16 18 20 22 1/00

1050 1000 950

Gain amp vs UTC time for 0212+735.MULTI.1 SN 2 Lpol IF 1

Plot file version 1 created 12-AUG-2003 18:59:54

1L MC

1200 1000 800 2L ON

1300 1200 1100 1000 900 3L MH

1400 1200 1000

6L NT

MilliGain

TIME (HOURS)

08 10 12 14 16 18 20

1300 1200 1100 1000

Gain amp vs UTC time for 0212+735.MULTI.1 SN 2 Lpol IF 2

Plot file version 2 created 12-AUG-2003 18:59:54

1L MC 2.0 1.5 1.0 2L ON 1.2 1.0 0.8 3L MH 1.6 1.4 1.2 6L NT

Gain

TIME (HOURS)

08 10 12 14 16 18 20

1.2 1.0 0.8

Gain amp vs UTC time for 0212+735.MULTI.1 SN 2 Lpol IF 3

Plot file version 3 created 12-AUG-2003 18:59:55

1L MC 2.0 1.5 1.0 2L ON 1.6 1.4 1.2 1.0 0.8 3L MH 1.6 1.4 1.2 1.0 0.8 6L NT

Gain

TIME (HOURS)

08 10 12 14 16 18 20

1.1 1.0 0.9

Gain amp vs UTC time for 0212+735.MULTI.1 SN 2 Lpol IF 4

Plot file version 4 created 12-AUG-2003 18:59:55

1L MC

1100 1000 900 800 2L ON

1300 1200 1100 1000

3L MH 1400 1200 1000

6L NT

MilliGain

TIME (HOURS)

08 10 12 14 16 18 20

1400 1200 1000

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Lpol IF 1

Plot file version 1 created 12-AUG-2003 19:02:25

1L MC

1000 950 900 2L ON

1025 1020 1015 1010 1005

3L MH

1080 1070 1060

6L NT

MilliGain

TIME (HOURS)

14 08 30 09 00 30 10 00 30 11 00

1245 1240 1235

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Lpol IF 2

Plot file version 2 created 12-AUG-2003 19:02:25

1L MC

1015 1010 1005

2L ON

1000 980 960 940 3L MH

1230 1220 1210 1200

6L NT

MilliGain

TIME (HOURS)

14 08 30 09 00 30 10 00 30 11 00

1040 1020 1000 980

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Lpol IF 3

Plot file version 3 created 12-AUG-2003 19:02:25

1L MC

1040 1020 1000980 960940

2L ON

1020 1000 980 960 3L MH

1035 1030 1025 1020

6L NT

MilliGain

TIME (HOURS)

14 08 30 09 00 30 10 00 30 11 00

930 925 920

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Lpol IF 4

Plot file version 4 created 12-AUG-2003 19:02:25

1L MC

1100 1050 1000

2L ON 910 900 890 880 3L MH

1125 1120 1115 1110

6L NT

MilliGain

TIME (HOURS)

14 08 30 09 00 30 10 00 30 11 00

1020 1000 980