Center at RA 03 59 29.74726 DEC 50 57 50.1621

CONT: NRAO150 IPOL 22248.731 MHZ NRAO150.IIM001.2

PLot file version 1 created 11-FEB-2004 14:46:10

Cont peak flux = 6.6961E+00 JY/BEAM Levs = 6.696E+00 * (-0.200, 0.200, 0.400, 0.800)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40