Gain amp vs UTC time for ei005c_1.TMP.1 CL 4 Rpol & Lpol IF 1 - 4

Plot file version 1 created 11-FEB-2004 14:51:45

2 ON IF 1L 140 120 100 80 60 40 2 ON IF 2L 80 60 40 2 ON IF 3L 70 60 50 40 2 ON IF 4L 80 60 40 3 MH IF 1R 120 100 80 60 3 MH IF 1L

Gain

100 80 60 40 3 MH IF 2L 60 50 40 3 MH IF 3R 75 70 65 60 55 3 MH IF 3L 70 60 50 4 CM IF 1R

TIME (HOURS)

1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

80 60 40 20

Gain amp vs UTC time for ei005c_1.TMP.1 CL 4 Rpol & Lpol IF 1 - 4

Plot file version 2 created 11-FEB-2004 14:51:45

4 CM IF 1L 40 30 20 5 JB IF 1R 80 60 40 5 JB IF 1L 50 40 30 5 JB IF 2L 80 60 40 5 JB IF 3R 44 42 40 38 5 JB IF 3L

Gain

35 30 25 5 JB IF 4L 36 34 32 30 6 NT IF 1R 90 80 70 60 50 6 NT IF 1L 120 100 80 60 40 6 NT IF 2L

TIME (HOURS)

1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

80 60 40

Gain amp vs UTC time for ei005c_1.TMP.1 CL 4 Rpol & Lpol IF 1 - 4

Plot file version 3 created 11-FEB-2004 14:51:45

6 NT IF 3R 60 50 40 6 NT IF 3L 80 60 40 6 NT IF 4L 80 70 60 50 7 EF IF 1R 16 14 12 7 EF IF 1L 14 12 10 7 EF IF 2L

Gain

20 18 16 14 12 7 EF IF 3R 15 14 13 7 EF IF 3L 15 14 13 12 7 EF IF 4L

TIME (HOURS)

1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14

15 14 13