Center at RA 02 17 30.81336 DEC 73 49 32.6218

CONT: 0212+735 IPOL 22248.028 MHZ 0212+735.ICL001.5

PLot file version 1 created 11-FEB-2005 11:51:43

Cont peak flux = 1.1025E+00 JY/BEAM Levs = 1.103E+00 * (-0.017, 0.017, 0.035, 0.069, 0.139, 0.277, 0.555)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40