Center at RA 01 36 58.59481 DEC 47 51 29.1001

CONT: 0133+476 IPOL 22230.350 MHZ 0133+476.ICL001.5

PLot file version 1 created 09-SEP-2005 10:36:58

Cont peak flux = 1.2459E+00 JY/BEAM Levs = 1.246E+00 * (-0.012, 0.012, 0.023, 0.046, 0.092, 0.185, 0.369, 0.739)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40