Center at RA 14 05 07.79544 DEC 40 56 57.8308

CONT: J1405+40 IPOL 1652.803 MHZ J1405+4056.ICL001.5

PLot file version 1 created 30-NOV-2005 16:53:38

Cont peak flux = 3.2026E-01 JY/BEAM Levs = 3.203E-01 * (-0.005, 0.005, 0.009, 0.019, 0.038, 0.076, 0.151, 0.302, 0.605)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250