Center at RA 16 55 43.23500 DEC 39 45 19.9400

CONT: J1655+39 IPOL 1652.803 MHZ J1655+3945.IIM001.1

PLot file version 1 created 30-NOV-2005 16:43:19

Cont peak flux = 1.1314E-02 JY/BEAM Levs = 1.131E-02 * (-0.361, 0.361, 0.722)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250