Center at RA 13 31 08.28805 DEC 30 30 32.9593

CONT: 3C286 IPOL 1652.803 MHZ 3C286.ICL001.5

PLot file version 1 created 21-NOV-2005 09:39:33

Cont peak flux = 6.1227E+00 JY/BEAM Levs = 6.123E+00 * (-0.021, 0.021, 0.043, 0.085, 0.171, 0.342, 0.683)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250