Center at RA 10 50 58.12296 DEC 34 30 10.9407

CONT: J1050+34 IPOL 1652.803 MHZ J1050+3430.ICL001.5

PLot file version 1 created 21-NOV-2005 09:38:22

Cont peak flux = 5.2944E-01 JY/BEAM Levs = 5.294E-01 * (-0.006, 0.006, 0.012, 0.025, 0.049, 0.098, 0.196, 0.393, 0.786)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250