Center at RA 11 30 42.42917 DEC 30 31 35.3877

CONT: J1130+30 IPOL 1652.803 MHZ J1130+3031.IIM001.2

PLot file version 1 created 21-NOV-2005 09:31:04

Cont peak flux = 2.7762E-01 JY/BEAM Levs = 2.776E-01 * (-0.118, 0.118, 0.235, 0.470, 0.940)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250