Center at RA 17 23 21.96480 DEC -00 17 00.8190

CONT: I17208 IPOL 1595.140 MHZ I17208.ICL001.1

PLot file version 1 created 09-FEB-2006 19:02:33

Cont peak flux = 1.4361E-03 JY/BEAM Levs = 1.436E-05 * (-40.1, 40.11, 80.22)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250