Center at RA 17 30 34.99947 DEC 00 24 38.6912

CONT: J1730+00 IPOL 1595.140 MHZ J1730+0024.ICL001.1

PLot file version 1 created 09-FEB-2006 19:01:54

Cont peak flux = 1.4307E-01 JY/BEAM Levs = 1.431E-03 * (-2.33, 2.333, 4.667, 9.333, 18.67, 37.33, 74.66)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250