Center at RA 17 43 58.85613 DEC -03 50 04.6167

CONT: J1743-03 IPOL 1595.140 MHZ J1743-0350.ICL001.3

PLot file version 1 created 09-FEB-2006 19:02:50

Cont peak flux = 2.7856E+00 JY/BEAM Levs = 2.786E-02 * (-0.686, 0.686, 1.373, 2.745, 5.490, 10.98, 21.96, 43.92, 87.84)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250