Center at RA 20 52 43.61987 DEC 16 19 48.8281

CONT: J2052+16 IPOL 1610.054 MHZ J2052+1619.IIM001.1

PLot file version 1 created 27-JAN-2006 16:22:29

Cont peak flux = 2.3564E-01 JY/BEAM Levs = 2.356E-03 * (-7.89, 7.894, 15.79, 31.58, 63.15)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250