Center at RA 21 39 01.30927 DEC 14 23 35.9921

CONT: J2139+14 IPOL 1610.054 MHZ J2139+1423.ICL001.2

PLot file version 1 created 27-JAN-2006 16:23:51

Cont peak flux = 1.2555E+00 JY/BEAM Levs = 1.256E-02 * (-2.16, 2.157, 4.315, 8.629, 17.26, 34.52, 69.03)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250