Center at RA 21 36 38.58633 DEC 00 41 54.2130

CONT: 2134+004 IPOL 1604.070 MHZ 2134+004.ICL001.2

PLot file version 1 created 09-FEB-2006 18:10:51

Cont peak flux = 4.0415E+00 JY/BEAM Levs = 4.041E-02 * (-0.932, 0.932, 1.864, 3.729, 7.458, 14.92, 29.83, 59.66)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250