Center at RA 13 31 08.28805 DEC 30 30 32.9593

CONT: 3C286 IPOL 1604.070 MHZ 3C286.ICL001.3

PLot file version 1 created 09-FEB-2006 18:11:08

Cont peak flux = 6.7531E+00 JY/BEAM Levs = 6.753E-02 * (-1.54, 1.542, 3.085, 6.170, 12.34, 24.68, 49.36, 98.71)

ARC SEC

ARC SEC

1.5 1.0 0.5 0.0 -0.5 -1.0 -1.5

1.5

1.0

0.5

0.0

-0.5

-1.0

-1.5