Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 16-FEB-2006 14:12:10

2 WB IF 1R 0 -5 -10 2 WB IF 1L 0 -2 -4 -6 -8 2 WB IF 2R 0 -2 -4 -6 -8 2 WB IF 2L 0 -5 -10 2 WB IF 3R 0 -5 -10 2 WB IF 3L

Degrees

0 -2 -4 -6 -8 2 WB IF 4R 0 -5 -10 2 WB IF 4L 0 -5 -10 2 WB IF 5R 0 -2 -4 -6 -8 2 WB IF 5L

TIME (HOURS)

11 36 37 38 39 40 41 42

0 -2 -4 -6 -8

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 16-FEB-2006 14:12:11

2 WB IF 6R 0 -5 -10 2 WB IF 6L 0 -5 -10 2 WB IF 7R 0 -5 -10 2 WB IF 7L 0 -5 -10 3 JB IF 1R 4 2 0 3 JB IF 1L

Degrees

3 2 1 0 3 JB IF 2R 4 2 0 3 JB IF 2L 4 2 0 3 JB IF 3R 4 2 0 3 JB IF 3L

TIME (HOURS)

11 36 37 38 39 40 41 42

4 2 0

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 16-FEB-2006 14:12:11

3 JB IF 4R 4 2 0 3 JB IF 4L 6 4 2 0 3 JB IF 5R 4 2 0 3 JB IF 5L 4 2 0 3 JB IF 6R 6 4 2 0 3 JB IF 6L

Degrees

6 4 2 0 3 JB IF 7R 4 2 0 3 JB IF 7L 4 2 0 3 JB IF 8R

0.010 0.005 0.000 -0.005

3 JB IF 8L

TIME (HOURS)

11 36 37 38 39 40 41 42

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 16-FEB-2006 14:12:11

4 ON IF 1R -2 -4 -6 4 ON IF 1L 0 -2 -4 4 ON IF 2R 2 0 -2 -4 4 ON IF 2L 2 0 -2 -4 4 ON IF 3R 2 0 -2 -4 -6 4 ON IF 3L

Degrees

2 0 -2 -4 -6 4 ON IF 4R 2 0 -2 -4 -6 4 ON IF 4L 5 0 -5 4 ON IF 5R 0 -2 -4 -6 4 ON IF 5L

TIME (HOURS)

11 36 37 38 39 40 41 42

0 -2 -4 -6

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 16-FEB-2006 14:12:11

4 ON IF 6R 2 0 -2 -4 -6 4 ON IF 6L 2 0 -2 -4 -6 4 ON IF 7R 360 358 356 354 4 ON IF 7L 0 -2 -4 -6 4 ON IF 8R -3 -4 -5 -6 4 ON IF 8L

Degrees

-2 -3 -4 -5 5 MC IF 2R 1 0 -1 5 MC IF 2L 0 -1 -2 5 MC IF 3R 360 359 358 357 5 MC IF 3L

TIME (HOURS)

11 36 37 38 39 40 41 42

-2.5

-3.0

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 16-FEB-2006 14:12:11

5 MC IF 4R 360 359 358 357 5 MC IF 4L

358.5

358.0

357.5

5 MC IF 5R 0 -1 -2 -3 5 MC IF 5L 358 357 356 5 MC IF 6R 2 0 -2 5 MC IF 6L

Degrees

1 0 -1 -2 7 TR IF 1R 0 -2 -4 -6 7 TR IF 1L 2 1 0 7 TR IF 2R 2 1 0 -1 7 TR IF 2L

TIME (HOURS)

11 36 37 38 39 40 41 42

4 2 0

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 7 created 16-FEB-2006 14:12:11

7 TR IF 3R 3 2 1 0 -1 7 TR IF 3L 6 4 2 7 TR IF 4R 4 2 0 7 TR IF 4L 8 6 4 2 0 7 TR IF 5R 2 1 0 7 TR IF 5L

Degrees

2 1 0 7 TR IF 6R 4 2 0 7 TR IF 6L 4 2 0 -2 7 TR IF 7R 2 1 0 -1 7 TR IF 7L

TIME (HOURS)

11 36 37 38 39 40 41 42

1 0 -1

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 8 created 16-FEB-2006 14:12:11

7 TR IF 8R 0.5 0.0 -0.5 -1.0

7 TR IF 8L 1.5 1.0 0.5 0.0 -0.5

8 UR IF 1R 3 2 1 0 -1 8 UR IF 1L 1.5 1.0 0.5 8 UR IF 2R 4 2 0 8 UR IF 2L

Degrees

3 2 1 0 -1 8 UR IF 3R 4 2 0 8 UR IF 3L 3 2 1 0 -1 8 UR IF 4R 4 2 0 8 UR IF 4L

TIME (HOURS)

11 36 37 38 39 40 41 42

2 0 -2

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 9 created 16-FEB-2006 14:12:11

8 UR IF 5R 3 2 1 0 8 UR IF 5L 2.0 1.5 1.0 8 UR IF 6R 5 4 3 2 1 8 UR IF 6L 4 2 0 8 UR IF 7R 1 0 -1 8 UR IF 7L

Degrees

1.0 0.5 0.0 -0.5

8 UR IF 8R -1 -2 -3 8 UR IF 8L 0.0 -0.5 -1.0

9 SH IF 1R 8 6 4 2 0 9 SH IF 1L

TIME (HOURS)

11 36 37 38 39 40 41 42

2.0 1.5 1.0 0.5

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 10 created 16-FEB-2006 14:12:11

9 SH IF 2R 2 0 -2 9 SH IF 2L 4 2 0 -2 -4 9 SH IF 3R 2 0 -2 -4 9 SH IF 3L 2 0 -2 -4 9 SH IF 4R 2 0 -2 -4 9 SH IF 4L

Degrees

2 0 -2 -4 9 SH IF 5R 2 0 -2 9 SH IF 5L 0 -2 -4 9 SH IF 6R 2 0 -2 -4 9 SH IF 6L

TIME (HOURS)

11 36 37 38 39 40 41 42

2 0 -2 -4

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 11 created 16-FEB-2006 14:12:11

9 SH IF 7R 358 357 356 9 SH IF 7L 359 358 357 356 9 SH IF 8R

356.5 356.0 355.5 355.0

9 SH IF 8L

Degrees

TIME (HOURS)

11 36 37 38 39 40 41 42

358 356 354