Center at RA 16 42 58.80997 DEC 39 48 36.9940

CONT: 3C345 IPOL 1657.521 MHZ 3C345.ICL001.2

PLot file version 1 created 16-FEB-2006 14:12:18

Cont peak flux = 4.9992E+00 JY/BEAM Levs = 4.999E-02 * (-1.70, 1.698, 3.396, 6.791, 13.58, 27.17, 54.33)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250