Center at RA 16 42 58.80997 DEC 39 48 36.9940

CONT: 3C345 IPOL 1657.521 MHZ 3C345.IIM001.1

PLot file version 1 created 27-JAN-2006 14:55:03

Cont peak flux = 3.2612E+00 JY/BEAM Levs = 3.261E-02 * (-21.7, 21.73, 43.47, 86.93)

MilliARC SEC

MilliARC SEC

300 200 100 0 -100 -200 -300

300

200

100

0

-100

-200

-300