Center at RA 17 18 56.92700 DEC 59 03 24.9500

CONT: AMS15 IPOL 1657.521 MHZ AMS15.IIM001.2

PLot file version 1 created 16-FEB-2006 14:09:43

Cont peak flux = 1.7166E-04 JY/BEAM Levs = 1.717E-06 * (-61.2, 61.21)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250