Plot file version 1 created 16-FEB-2006 14:14:46 V vs U for AMS15.MULTI.1 Source:AMS15 Ants * - * Stokes I IF# 1 - 8 Chan# 1

Freq = 1.5950 GHz, Bw = 16.000 MHz

Mega Wavlngth

Mega Wavlngth

-40 -30 -20 -10 0 10 20 30 40

40

30

20

10

0

-10

-20

-30

-40