Center at RA 17 20 45.17000 DEC 58 52 21.3350

CONT: AMS17 IPOL 1657.521 MHZ AMS17.IIM001.1

PLot file version 1 created 16-FEB-2006 14:09:04

Cont peak flux = -2.6746E-04 JY/BEAM Levs = 2.675E-06 * (-66.4, 66.42)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250