IF 1- 1 CH 1- 1 STK I CC ver 0

Closure Phase vs Time for J1722+5856.UVSUB.1

PLot file version 1 created 16-FEB-2006 14:13:32 20 10 0 -10 -20 -30

EF-WB-JB

40 20 0 -20 -40 -60

EF-WB-ON

Degrees

150 100 50 0

EF-WB-TR

0 -50 -100

-150

EF-WB-UR

TIME (HOURS)

10 11 12 13 14 15 16 17

50 0 -50

EF-WB-SH

IF 1- 1 CH 1- 1 STK I CC ver 0

Closure Phase vs Time for J1722+5856.UVSUB.1

PLot file version 2 created 16-FEB-2006 14:13:32

10 0 -10 -20

EF-JB-ON

10 0 -10

EF-JB-TR

Degrees

40 30 20 10 0 -10

EF-JB-UR

100 50 0 -50

EF-JB-SH

TIME (HOURS)

10 11 12 13 14 15 16 17

80 60 40 20 0 -20

EF-ON-TR

IF 1- 1 CH 1- 1 STK I CC ver 0

Closure Phase vs Time for J1722+5856.UVSUB.1

PLot file version 3 created 16-FEB-2006 14:13:32

50 0 -50 -100 -150

EF-ON-UR

100 0 -100

EF-ON-SH

Degrees

50 0 -50

EF-TR-UR

200 100 0 -100

EF-TR-SH

TIME (HOURS)

10 11 12 13 14 15 16 17

100 50 0 -50

EF-UR-SH

IF 1- 1 CH 1- 1 STK I CC ver 0

Closure Phase vs Time for J1722+5856.UVSUB.1

PLot file version 4 created 16-FEB-2006 14:13:33

50 0 -50 -100 -150

WB-JB-ON

100 50 0 -50 -100 -150

WB-JB-TR

Degrees

200 100 0 -100

WB-JB-UR

100 50 0 -50 -100 -150

WB-JB-SH

TIME (HOURS)

10 11 12 13 14 15 16 17

100 0 -100

WB-ON-TR

IF 1- 1 CH 1- 1 STK I CC ver 0

Closure Phase vs Time for J1722+5856.UVSUB.1

PLot file version 5 created 16-FEB-2006 14:13:33

200 100 0 -100

WB-ON-UR

200 100 0 -100

WB-ON-SH

Degrees

150 100 50 0 -50

WB-TR-UR

100 0 -100

WB-TR-SH

TIME (HOURS)

10 11 12 13 14 15 16 17

200 150 100 50 0 -50

WB-UR-SH

IF 1- 1 CH 1- 1 STK I CC ver 0

Closure Phase vs Time for J1722+5856.UVSUB.1

PLot file version 6 created 16-FEB-2006 14:13:33

100 50 0

JB-ON-TR

100 50 0 -50 -100 -150

JB-ON-UR

Degrees

200 100 0 -100

JB-ON-SH

100 50 0 -50

JB-TR-UR

TIME (HOURS)

10 11 12 13 14 15 16 17

100 0 -100

JB-TR-SH

IF 1- 1 CH 1- 1 STK I CC ver 0

Closure Phase vs Time for J1722+5856.UVSUB.1

PLot file version 7 created 16-FEB-2006 14:13:33

100 0 -100

JB-UR-SH

200 100 0 -100

ON-TR-UR

Degrees

200 100 0 -100

ON-TR-SH

200 100 0 -100

ON-UR-SH

TIME (HOURS)

10 11 12 13 14 15 16 17

150 100 50 0 -50 -100

TR-UR-SH