Gain amp vs UTC time for J1722+6105.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 16-FEB-2006 14:10:17

1 EF IF 1R

1.05 1.04 1.03 1.02 1.01

1 EF IF 1L

1.00 0.95 0.90

1 EF IF 2R

1.15 1.10 1.05

1 EF IF 2L

1.05 1.00 0.95 0.90

1 EF IF 3R 1.4 1.2 1.0 1 EF IF 3L

Gain

1.02 1.00 0.98 0.96 0.94 1 EF IF 4R 1.3 1.2 1.1 1.0 1 EF IF 4L

1.02 1.00 0.98 0.96 0.94 1 EF IF 5R

1.10 1.05 1.00

1 EF IF 5L

TIME (HOURS)

09 10 11 12 13 14 15 16 17 18

1.02 1.00 0.98 0.96

Gain amp vs UTC time for J1722+6105.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 16-FEB-2006 14:10:17

1 EF IF 6R

1.15 1.10 1.05

1 EF IF 6L

1.04 1.02 1.00 0.98 1 EF IF 7R

1.10 1.05 1.00

1 EF IF 7L

1.00 0.95 0.90 1 EF IF 8R 1.2 1.1 1.0 1 EF IF 8L

Gain

1.10 1.05 1.00 0.95 2 WB IF 1R 2.5 2.0 1.5 2 WB IF 1L 1.6 1.4 1.2 1.0 2 WB IF 2R 1.8 1.6 1.4 1.2 1.0 2 WB IF 2L

TIME (HOURS)

09 10 11 12 13 14 15 16 17 18

1.4 1.2 1.0

Gain amp vs UTC time for J1722+6105.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 16-FEB-2006 14:10:17

2 WB IF 3R 1.8 1.6 1.4 1.2 1.0 2 WB IF 3L 2.0 1.5 1.0 2 WB IF 4R 1.8 1.6 1.4 1.2 1.0 2 WB IF 4L 1.8 1.6 1.4 1.2 1.0 2 WB IF 5R 1.8 1.6 1.4 1.2 1.0 2 WB IF 5L

Gain

1.8 1.6 1.4 1.2 1.0 2 WB IF 6R 2.0 1.5 1.0 2 WB IF 6L 2.0 1.5 1.0 2 WB IF 7R 1.8 1.6 1.4 1.2 1.0 2 WB IF 7L

TIME (HOURS)

09 10 11 12 13 14 15 16 17 18

1.8 1.6 1.4 1.2 1.0

Gain amp vs UTC time for J1722+6105.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 16-FEB-2006 14:10:17

3 JB IF 1R

0.90

0.85

0.80 3 JB IF 1L

0.82 0.80 0.78

3 JB IF 2R

1.06 1.04 1.02 1.00 0.98 3 JB IF 2L

1.15 1.10 1.05 1.00 3 JB IF 3R

1.06 1.04 1.02 1.00 0.98 0.96 3 JB IF 3L

Gain

1.3 1.2 1.1 3 JB IF 4R

0.98 0.96 0.94 0.92 3 JB IF 4L 1.3 1.2 1.1 3 JB IF 5R

1.00 0.95 0.90 0.85

3 JB IF 5L

TIME (HOURS)

09 10 11 12 13 14 15 16 17 18

1.02 1.00 0.98 0.96 0.94 0.92

Gain amp vs UTC time for J1722+6105.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 16-FEB-2006 14:10:17

3 JB IF 6R

1.02 1.00 0.98 0.96 0.94 0.92

3 JB IF 6L

1.05

1.00

0.95

3 JB IF 7R

1.05 1.00 0.95 0.90

3 JB IF 7L

1.00 0.95 0.90 0.85

3 JB IF 8R

0.96 0.94 0.92 0.90

3 JB IF 8L

Gain

0.94 0.92 0.90 0.88

4 ON IF 1R 1.2 1.1 1.0 0.9 4 ON IF 1L

1.05 1.00 0.95 0.90 0.85

4 ON IF 2R

0.95 0.90 0.85

4 ON IF 2L

TIME (HOURS)

09 10 11 12 13 14 15 16 17 18

1.00 0.95 0.90 0.85

Gain amp vs UTC time for J1722+6105.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 6 created 16-FEB-2006 14:10:17

4 ON IF 3R

1.00 0.98 0.96 0.94 0.92

4 ON IF 3L

1.02 1.00 0.98 0.96 0.94 0.92

4 ON IF 4R

1.05

1.00

0.95

0.90

4 ON IF 4L

1.00

0.95

0.90

4 ON IF 5R

1.00

0.95

0.90

4 ON IF 5L

Gain

1.00

0.95

0.90

4 ON IF 6R

1.02 1.00 0.98 0.96 0.94 0.92

4 ON IF 6L

1.04 1.02 1.00 0.98 0.96 0.94

4 ON IF 7R 1.0 0.9 0.8 0.7 4 ON IF 7L

TIME (HOURS)

09 10 11 12 13 14 15 16 17 18

0.98 0.96 0.94 0.92

Gain amp vs UTC time for J1722+6105.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 7 created 16-FEB-2006 14:10:17

4 ON IF 8R 1.0 0.9 0.8 0.7 4 ON IF 8L

1.00 0.95 0.90 0.85

5 MC IF 2R 1.6 1.5 1.4 5 MC IF 2L

1.25

1.20

1.15

5 MC IF 3R

1.00 0.95 0.90

5 MC IF 3L

Gain

1.00 0.95 0.90

5 MC IF 4R 1.1 1.0 0.9 5 MC IF 4L

1.00 0.95 0.90 0.85

5 MC IF 5R 1.1 1.0 0.9 5 MC IF 5L

TIME (HOURS)

09 10 11 12 13 14 15 16 17 18

1.00 0.95 0.90

Gain amp vs UTC time for J1722+6105.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 8 created 16-FEB-2006 14:10:17

5 MC IF 6R

1.15 1.10 1.05 1.00 0.95

5 MC IF 6L

1.10 1.05 1.00 0.95

5 MC IF 7R 2.0 1.5 1.0 5 MC IF 7L 1.8 1.6 1.4 1.2 1.0 0.8 5 MC IF 8R 0.8 0.6 0.4 5 MC IF 8L

Gain

0.6 0.4 0.2 7 TR IF 1R 1.1 1.0 0.9 0.8 0.7 7 TR IF 1L 0.8 0.7 0.6 7 TR IF 2R 1.0 0.9 0.8 7 TR IF 2L

TIME (HOURS)

09 10 11 12 13 14 15 16 17 18

0.85 0.80 0.75 0.70

Gain amp vs UTC time for J1722+6105.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 9 created 16-FEB-2006 14:10:17

7 TR IF 3R 1.0 0.9 0.8 7 TR IF 3L

0.86 0.84 0.82 0.80 0.78

7 TR IF 4R 1.1 1.0 0.9 7 TR IF 4L

0.90 0.88 0.86 0.84 0.82

7 TR IF 5R

0.95 0.90 0.85 0.80 0.75

7 TR IF 5L

Gain

0.8 0.7 0.6 7 TR IF 6R 1.0 0.9 0.8 7 TR IF 6L 0.8 0.7 0.6 7 TR IF 7R 1.0 0.9 0.8 7 TR IF 7L

TIME (HOURS)

09 10 11 12 13 14 15 16 17 18

0.75

0.70

Gain amp vs UTC time for J1722+6105.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 10 created 16-FEB-2006 14:10:17

7 TR IF 8R 1.0 0.9 0.8 7 TR IF 8L

0.85 0.80 0.75 0.70

8 UR IF 1R

0.78 0.76 0.74 0.72 0.70 0.68

8 UR IF 1L

1.15 1.10 1.05

8 UR IF 2R

0.73 0.72 0.71

8 UR IF 2L

Gain

1.15 1.10 1.05

8 UR IF 3R

0.90

0.85

0.80

8 UR IF 3L

1.10 1.05 1.00 0.95

8 UR IF 4R

0.88 0.86 0.84 0.82

8 UR IF 4L

TIME (HOURS)

09 10 11 12 13 14 15 16 17 18

1.06 1.04 1.02 1.00

Gain amp vs UTC time for J1722+6105.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 11 created 16-FEB-2006 14:10:17

8 UR IF 5R

0.95 0.90 0.85

8 UR IF 5L

1.00 0.95 0.90

8 UR IF 6R 1.0 0.9 0.8 8 UR IF 6L

1.05 1.00 0.95 0.90 0.85

8 UR IF 7R 1.6 1.4 1.2 8 UR IF 7L

Gain

1.0 0.9 0.8 8 UR IF 8R 1.6 1.4 1.2 8 UR IF 8L

1.00 0.95 0.90 0.85

9 SH IF 1R 1.6 1.4 1.2 1.0 9 SH IF 1L

TIME (HOURS)

09 10 11 12 13 14 15 16 17 18

1.2 1.1 1.0 0.9

Gain amp vs UTC time for J1722+6105.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 12 created 16-FEB-2006 14:10:17

9 SH IF 2R 1.3 1.2 1.1 1.0 9 SH IF 2L

1.05 1.00 0.95

9 SH IF 3R

1.08 1.06 1.04 1.02 1.00

9 SH IF 3L

1.00

0.95

0.90

9 SH IF 4R

1.15 1.10 1.05 1.00

9 SH IF 4L

Gain

1.05 1.00 0.95 0.90

9 SH IF 5R

1.10 1.05 1.00

9 SH IF 5L

1.05 1.00 0.95 0.90 0.85

9 SH IF 6R

1.15 1.10 1.05 1.00

9 SH IF 6L

TIME (HOURS)

09 10 11 12 13 14 15 16 17 18

1.05 1.00 0.95 0.90