Center at RA 20 05 30.99851 DEC 77 52 43.2476

CONT: J2005+77 IPOL 1657.521 MHZ J2005+7752.ICL001.3

PLot file version 1 created 16-FEB-2006 14:12:10

Cont peak flux = 1.0622E+00 JY/BEAM Levs = 1.062E-02 * (-2.01, 2.007, 4.014, 8.027, 16.05, 32.11, 64.22)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250