Center at RA 20 05 30.99851 DEC 77 52 43.2476

CONT: J2005+77 IPOL 1657.521 MHZ J2005+7752.ICL001.3

PLot file version 1 created 27-JAN-2006 14:57:55

Cont peak flux = 1.1885E+00 JY/BEAM Levs = 1.189E-02 * (-0.540, 0.540, 1.081, 2.162, 4.323, 8.646, 17.29, 34.59, 69.17)

MilliARC SEC

MilliARC SEC

300 200 100 0 -100 -200 -300

300

200

100

0

-100

-200

-300