Center at RA 20 05 30.99851 DEC 77 52 43.2476

CONT: J2005+77 IPOL 1657.521 MHZ J2005+7752.IIM001.2

PLot file version 1 created 27-JAN-2006 14:54:54

Cont peak flux = 1.6148E+00 JY/BEAM Levs = 1.615E-02 * (-0.001, 0.001, 0.001, 0.002, 0.005, 0.010, 0.020, 0.040, 0.079, 0.159, 0.317, 0.634, 1.268, 2.537, 5.073, 10.15, 20.29, 40.58, 81.17)

MilliARC SEC

MilliARC SEC

300 200 100 0 -100 -200 -300

300

200

100

0

-100

-200

-300