Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 14-FEB-2006 12:06:55

1 EF IF 1R

1080

1060

1040

1020 1 EF IF 1L

1040 1020 1000 980 960 1 EF IF 2R

1090

1080

1070

1 EF IF 2L

1040

1020

1000 1 EF IF 3R

1015 1010 1005 1000

1 EF IF 3L

MilliGain

1005 1000 995 990 985 1 EF IF 4R

1040

1020

1000

1 EF IF 4L

1000 980 960 1 EF IF 5R

1030 1020 1010 1000 990 1 EF IF 5L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

1040 1030 1020 1010

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 14-FEB-2006 12:06:55

1 EF IF 6R

1050 1040 1030 1020

1 EF IF 6L

1060 1050 1040

1 EF IF 7R

1020 1015 1010 1005 1 EF IF 7L

1015 1010 1005 1000 995 1 EF IF 8R

1020

1015

1010

1 EF IF 8L

MilliGain

1052 1050 1048 1046 1044 1042 2 WB IF 1R

1435 1430 1425 1420 2 WB IF 1L 945 940 935 930 2 WB IF 2R

1055 1050 1045 1040

2 WB IF 2L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

960 955 950 945

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 14-FEB-2006 12:06:55

2 WB IF 3R 975 970 965 960 2 WB IF 3L 970 965 960 955 2 WB IF 4R 930 925 920 915 2 WB IF 4L 920 915 910 905 2 WB IF 5R 965 960 955 950 2 WB IF 5L

MilliGain

1040 1035 1030 1025

2 WB IF 6R

1060 1055 1050 1045 2 WB IF 6L

1085 1080 1075 1070 2 WB IF 7R 960 955 950 945 2 WB IF 7L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

945 940 935 930

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 14-FEB-2006 12:06:55

4 ON IF 1R 950 940 930 920 910 4 ON IF 1L 960 940 920 4 ON IF 2R 900 890 880 4 ON IF 2L 930 920 910 900 4 ON IF 3R

1020 1010 1000 990 4 ON IF 3L

MilliGain

1050 1045 1040 1035

4 ON IF 4R

1040 1020 1000

4 ON IF 4L

1070 1060 1050 1040 1030

4 ON IF 5R

1000 980 960 4 ON IF 5L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

1020

1000 980

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 14-FEB-2006 12:06:55

4 ON IF 6R

1020 1000 980 960 4 ON IF 6L

1030 1020 1010 1000 990 4 ON IF 7R 960 940 920 4 ON IF 7L 990 980 970 960 4 ON IF 8R 960 940 920 4 ON IF 8L

MilliGain

1020 1000 980 5 MC IF 2R

1440 1420 1400 1380

5 MC IF 2L

1110

1100

1090

5 MC IF 3R 920 910 900 5 MC IF 3L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

920 915 910 905

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 6 created 14-FEB-2006 12:06:55

5 MC IF 4R

1020 1000 980 5 MC IF 4L 960 940 920 5 MC IF 5R

1000 950 900 850 5 MC IF 5L 920 900 880 860 5 MC IF 6R

1060 1040 1020 1000 980 960 5 MC IF 6L

MilliGain

1025 1020 1015 1010 1005

5 MC IF 8R

1295 1290 1285 1280

5 MC IF 8L

1315 1310 1305 1300

7 TR IF 1R 930 920 910 900 890 7 TR IF 1L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

860 850 840

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 7 created 14-FEB-2006 12:06:55

7 TR IF 2R 965 960 955 7 TR IF 2L 940 920 900 7 TR IF 3R

1045 1040 1035

7 TR IF 3L 975 970 965 960 955 7 TR IF 4R

1140

1120

1100

7 TR IF 4L

MilliGain

1050 1040 1030 1020 1010

7 TR IF 5R 930 920 910 900 7 TR IF 5L 940 930 920 910 7 TR IF 6R 960 950 940 930 7 TR IF 6L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

940 930 920

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 8 created 14-FEB-2006 12:06:55

7 TR IF 7R 935 930 925 920 7 TR IF 7L 800 795 790 785 7 TR IF 8R 980 970 960 7 TR IF 8L 890 880 870 8 UR IF 1R 820 810 800 8 UR IF 1L

MilliGain

1260 1240 1220 1200 1180 1160

8 UR IF 2R 760 740 720 8 UR IF 2L

1140 1130 1120 1110

8 UR IF 3R

1170 1165 1160 1155

8 UR IF 3L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

980 975 970

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 9 created 14-FEB-2006 12:06:55

8 UR IF 4R

1150 1140 1130 1120

8 UR IF 4L 980 970 960 8 UR IF 5R 950 940 930 920 8 UR IF 5L 980 970 960 950 8 UR IF 6R 940 930 920 8 UR IF 6L

MilliGain

975 970 965 960 955 8 UR IF 7R

1400 1380 1360

8 UR IF 7L 830 820 810 8 UR IF 8R

1300 1290 1280 1270

8 UR IF 8L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

790 785 780 775

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 10 created 14-FEB-2006 12:06:55

9 SH IF 1R

1000 980 960 9 SH IF 1L

1020

1000 980 9 SH IF 2R

1020

1010

1000

9 SH IF 2L

1035 1030 1025 1020 1015

9 SH IF 3R

1050

1000 950 900 9 SH IF 3L

MilliGain

1050

1000 950 9 SH IF 4R

1050 1000 950 900 9 SH IF 4L

1050 1000 950 9 SH IF 5R 980 960 940 920 900 9 SH IF 5L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

1080 1060 1040 1020

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 8

Plot file version 11 created 14-FEB-2006 12:06:55

9 SH IF 6R

1050 1000 950 900 9 SH IF 6L

1150 1100 1050 1000

9 SH IF 7R

1120 1100 1080 1060 1040 1020

9 SH IF 7L

1120 1100 1080 1060 1040 1020

9 SH IF 8R

1080 1060 1040 1020 1000 980 9 SH IF 8L

MilliGain

TIME (HOURS)

11 36 37 38 39 40 41 42 43

1100

1050

1000