Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 1 created 14-FEB-2006 12:06:44

1 EF IF 1R

0.010 0.005 0.000 -0.005

1 EF IF 1L

0.010 0.005 0.000 -0.005

1 EF IF 2R

0.010 0.005 0.000 -0.005

1 EF IF 2L

0.010 0.005 0.000 -0.005

1 EF IF 3R

0.010 0.005 0.000 -0.005

1 EF IF 3L

Degrees

0.010 0.005 0.000 -0.005

1 EF IF 4R

0.010 0.005 0.000 -0.005

1 EF IF 4L

0.010 0.005 0.000 -0.005

1 EF IF 5R

0.010 0.005 0.000 -0.005

1 EF IF 5L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 2 created 14-FEB-2006 12:06:44

1 EF IF 6R

0.010 0.005 0.000 -0.005

1 EF IF 6L

0.010 0.005 0.000 -0.005

1 EF IF 7R

0.010 0.005 0.000 -0.005

1 EF IF 7L

0.010 0.005 0.000 -0.005

1 EF IF 8R

0.010 0.005 0.000 -0.005

1 EF IF 8L

Degrees

0.010 0.005 0.000 -0.005

2 WB IF 1R

2.670 2.665 2.660 2.655 2 WB IF 1L

2.005 2.000 1.995 1.990

2 WB IF 2R

2.585 2.580 2.575 2.570

2 WB IF 2L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

1.910 1.905 1.900 1.895

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 3 created 14-FEB-2006 12:06:44

2 WB IF 3R

2.925 2.920 2.915 2.910

2 WB IF 3L

2.205 2.200 2.195 2.190

2 WB IF 4R

1.630 1.625 1.620 1.615 2 WB IF 4L

1.230 1.225 1.220 1.215 2 WB IF 5R

2.065 2.060 2.055 2.050 2 WB IF 5L

Degrees

2.185 2.180 2.175 2.170 2 WB IF 6R

0.790 0.785 0.780 0.775 2 WB IF 6L

0.975 0.970 0.965 0.960 2 WB IF 7R

1.620 1.615 1.610 1.605 2 WB IF 7L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

1.735 1.730 1.725 1.720

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 4 created 14-FEB-2006 12:06:44

4 ON IF 1R 0 -2 -4 4 ON IF 1L 0 -2 -4 4 ON IF 2R 0 -2 -4 4 ON IF 2L 1 0 -1 -2 -3 4 ON IF 3R 0 -2 -4 4 ON IF 3L

Degrees

0 -2 -4 4 ON IF 4R 0 -2 -4 4 ON IF 4L 0 -2 -4 4 ON IF 5R 360 358 356 4 ON IF 5L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

0 -2 -4

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 5 created 14-FEB-2006 12:06:44

4 ON IF 6R 0 -2 -4 4 ON IF 6L 0 -2 -4 4 ON IF 7R 359 358 357 356 4 ON IF 7L 0 -2 -4 4 ON IF 8R 359 358 357 356 355 4 ON IF 8L

Degrees

0 -2 -4 5 MC IF 2R 2 0 -2 -4 -6 5 MC IF 2L 2 0 -2 -4 -6 5 MC IF 3R 0 -2 -4 -6 5 MC IF 3L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

0 -2 -4 -6

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 6 created 14-FEB-2006 12:06:44

5 MC IF 4R 2 0 -2 -4 -6 5 MC IF 4L 0 -2 -4 -6 5 MC IF 5R 0 -2 -4 -6 5 MC IF 5L 0 -2 -4 -6 5 MC IF 6R 2 0 -2 -4 -6 5 MC IF 6L

Degrees

2 0 -2 -4 -6 5 MC IF 8R

-0.775 -0.780 -0.785 -0.790

5 MC IF 8L

-2.205 -2.210 -2.215 -2.220

7 TR IF 1R -1 -2 -3 -4 -5 7 TR IF 1L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

-2 -3 -4

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 7 created 14-FEB-2006 12:06:44

7 TR IF 2R

-1.5 -2.0 -2.5 -3.0 -3.5

7 TR IF 2L 360 359 358 7 TR IF 3R 359 358 357 7 TR IF 3L 359 358 357 7 TR IF 4R 0 -1 -2 7 TR IF 4L

Degrees

-0.5 -1.0 -1.5 -2.0 -2.5

7 TR IF 5R -1 -2 -3 7 TR IF 5L

-0.5 -1.0 -1.5 -2.0 -2.5

7 TR IF 6R 0 -1 -2 7 TR IF 6L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

-1 -2 -3

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 8 created 14-FEB-2006 12:06:44

7 TR IF 7R -1 -2 -3 7 TR IF 7L 358 357 356 7 TR IF 8R

-2.5 -3.0 -3.5 -4.0

7 TR IF 8L

358.0 357.5 357.0 356.5

8 UR IF 1R 1.5 1.0 0.5 0.0 8 UR IF 1L

Degrees

0.5 0.0 -0.5

8 UR IF 2R 2 1 0 8 UR IF 2L 2.5 2.0 1.5 1.0 8 UR IF 3R 2.0 1.5 1.0 0.5 8 UR IF 3L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

2.0 1.5 1.0 0.5

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 9 created 14-FEB-2006 12:06:44

8 UR IF 4R 1.5 1.0 0.5 0.0 8 UR IF 4L 2.0 1.5 1.0 0.5 8 UR IF 5R 1.5 1.0 0.5 0.0 8 UR IF 5L 2.0 1.5 1.0 0.5 8 UR IF 6R 2.0 1.5 1.0 0.5 8 UR IF 6L

Degrees

2.0 1.5 1.0 0.5 8 UR IF 7R 1.0 0.5 0.0 -0.5

8 UR IF 7L 1.5 1.0 0.5 0.0 8 UR IF 8R 0.5 0.0 -0.5 -1.0

8 UR IF 8L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

2 1 0

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 10 created 14-FEB-2006 12:06:44

9 SH IF 1R 3.0 2.5 2.0 9 SH IF 1L 2.0 1.5 1.0 9 SH IF 2R 3.0 2.5 2.0 9 SH IF 2L 1.8 1.6 1.4 1.2 1.0 9 SH IF 3R 2 1 0 9 SH IF 3L

Degrees

2 1 0 9 SH IF 4R 1.5 1.0 0.5 0.0 -0.5

9 SH IF 4L 1.5 1.0 0.5 0.0 -0.5

9 SH IF 5R 1.0 0.5 0.0 -0.5

9 SH IF 5L

TIME (HOURS)

11 36 37 38 39 40 41 42 43

1 0 -1

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Rpol & Lpol IF 1 - 8

Plot file version 11 created 14-FEB-2006 12:06:44

9 SH IF 6R

-0.5 -1.0 -1.5 -2.0

9 SH IF 6L 0 -1 -2 9 SH IF 7R

359.5 359.0 358.5 358.0 357.5

9 SH IF 7L

-1.0 -1.5 -2.0 -2.5

9 SH IF 8R

358.5 358.0 357.5 357.0

9 SH IF 8L

Degrees

TIME (HOURS)

11 36 37 38 39 40 41 42 43

358.0 357.5 357.0 356.5