Center at RA 17 13 40.19100 DEC 59 27 45.7610

CONT: AMS03 IPOL 1657.521 MHZ AMS03.ICL001.1

PLot file version 1 created 14-FEB-2006 12:03:52

Cont peak flux = 8.3964E-04 JY/BEAM Levs = 8.396E-06 * (-20.8, 20.77, 41.54, 83.09)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250