Center at RA 17 22 36.72656 DEC 58 56 22.2607

CONT: J1722+58 IPOL 1657.521 MHZ J1722+5856.ICL001.1

PLot file version 1 created 15-FEB-2006 19:20:55

Cont peak flux = 1.0160E-01 JY/BEAM Levs = 1.016E-03 * (-1.10, 1.101, 2.202, 4.404, 8.807, 17.61, 35.23, 70.46)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250