Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Lpol IF 1

Plot file version 1 created 03-DEC-2003 10:12:42

3L MH

14.100 14.095 14.090 14.085

4L CM

0.520 0.515 0.510 0.505 5L JB

1.480 1.475 1.470 1.465

6L NT

10.280 10.275 10.270 10.265

7L EF

Gain

TIME (HOURS)

16 18 20 22 1/00 1/02

2.5 2.0 1.5 1.0 0.5

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Lpol IF 2

Plot file version 2 created 03-DEC-2003 10:12:43

4L CM

41.475 41.470 41.465 41.460

6L NT

19.210 19.205 19.200 19.195

7L EF

Gain

TIME (HOURS)

16 18 20 22 1/00 1/02

3 2 1

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Lpol IF 1

Plot file version 1 created 03-DEC-2003 10:21:52

3L MH

14.100 14.095 14.090 14.085

4L CM

0.520 0.515 0.510 0.505 5L JB

1.480 1.475 1.470 1.465

6L NT

10.280 10.275 10.270 10.265

7L EF

Gain

TIME (HOURS)

16 18 20 22 1/00 1/02

2.5 2.0 1.5 1.0 0.5

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Lpol IF 2

Plot file version 2 created 03-DEC-2003 10:21:52

4L CM

41.475 41.470 41.465 41.460

6L NT

19.210 19.205 19.200 19.195

7L EF

Gain

TIME (HOURS)

16 18 20 22 1/00 1/02

3 2 1