Gain phs vs UTC time for 1611+343.MULTI.1 SN 1 Rpol IF 1

Plot file version 1 created 03-DEC-2003 09:22:04

2R ON 300 250 200 3R MH

45.585 45.580 45.575 45.570

4R CM 50 0 -50 5R JB 50 0 6R NT 10 0 -10 -20 7R EF

Degrees

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01 1/02

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 1611+343.MULTI.1 SN 1 Rpol IF 2

Plot file version 2 created 03-DEC-2003 09:22:05

2R ON 100 0 -100

5R JB 60 40 20 0 -20 7R EF

Degrees

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01 1/02

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 1611+343.MULTI.1 SN 1 Lpol IF 1

Plot file version 3 created 03-DEC-2003 09:22:05

2L ON 100 50 0 3L MH 40 20 0 -20 4L CM 50 0 -50 -100

5L JB 20 0 -20 -40 6L NT 10 0 -10 -20 7L EF

Degrees

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01 1/02

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 1611+343.MULTI.1 SN 1 Lpol IF 2

Plot file version 4 created 03-DEC-2003 09:22:05

2L ON 40 20 0 -20 3L MH

7.695 7.690 7.685 7.680 4L CM 100 50 0 5L JB 10 0 -10 -20 6L NT 20 0 -20 7L EF

Degrees

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01 1/02

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 1611+343.MULTI.1 SN 1 Rpol IF 1

Plot file version 1 created 03-DEC-2003 09:49:12

2R ON 300 250 200 3R MH

45.585 45.580 45.575 45.570

4R CM 50 0 -50 5R JB 50 0 6R NT 10 0 -10 -20 7R EF

Degrees

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01 1/02

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 1611+343.MULTI.1 SN 1 Rpol IF 2

Plot file version 2 created 03-DEC-2003 09:49:13

2R ON 100 0 -100

5R JB 60 40 20 0 -20 7R EF

Degrees

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01 1/02

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 1611+343.MULTI.1 SN 1 Lpol IF 1

Plot file version 3 created 03-DEC-2003 09:49:13

2L ON 100 50 0 3L MH 40 20 0 -20 4L CM 50 0 -50 -100

5L JB 20 0 -20 -40 6L NT 10 0 -10 -20 7L EF

Degrees

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01 1/02

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 1611+343.MULTI.1 SN 1 Lpol IF 2

Plot file version 4 created 03-DEC-2003 09:49:13

2L ON 40 20 0 -20 3L MH

7.695 7.690 7.685 7.680

4L CM 100 50 0 5L JB 10 0 -10 -20 6L NT 20 0 -20 7L EF

Degrees

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01 1/02

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Lpol IF 1

Plot file version 1 created 03-DEC-2003 10:11:58

2L ON 21 20 19 3L MH 80 60 40 20 0 4L CM

20.225 20.220 20.215 20.210

5L JB

-54.905 -54.910 -54.915 -54.920

6L NT 50 0 -50 -100

7L EF

Degrees

TIME (HOURS)

16 18 20 22 1/00 1/02

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Lpol IF 2

Plot file version 2 created 03-DEC-2003 10:11:59

2L ON 40 30 20 10 3L MH

-43.270 -43.275 -43.280 -43.285

4L CM 350 300 250 5L JB 0 -20 -40 -60 6L NT 10 8 6 4 7L EF

Degrees

TIME (HOURS)

16 18 20 22 1/00 1/02

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Lpol IF 1

Plot file version 1 created 03-DEC-2003 10:21:08

2L ON 21 20 19 3L MH 80 60 40 20 0 4L CM

20.225 20.220 20.215 20.210

5L JB

-54.905 -54.910 -54.915 -54.920

6L NT 50 0 -50 -100

7L EF

Degrees

TIME (HOURS)

16 18 20 22 1/00 1/02

0.010 0.005 0.000 -0.005

Gain phs vs UTC time for 3C345.MULTI.1 SN 1 Lpol IF 2

Plot file version 2 created 03-DEC-2003 10:21:08

2L ON 40 30 20 10 3L MH

-43.270 -43.275 -43.280 -43.285

4L CM 350 300 250 5L JB 0 -20 -40 -60 6L NT 10 8 6 4 7L EF

Degrees

TIME (HOURS)

16 18 20 22 1/00 1/02

0.010 0.005 0.000 -0.005