Delay vs UTC time for el031b.UVAVG.1 SN 2 Rpol IF 1

Plot file version 1 created 03-DEC-2003 08:47:30

2R ON 20 10 0 3R MH 40 30 20 4R CM 10 8 6 4 2 5R JB 4 2 0 -2 6R NT 28 26 24 22 20 7R EF

Nano Seconds

TIME (HOURS)

16 18 20 22 1/00 1/02

0.1 0.0 -0.1

Delay vs UTC time for el031b.UVAVG.1 SN 2 Rpol IF 2

Plot file version 2 created 03-DEC-2003 08:47:31

2R ON 0 -5 -10 3R MH 14 12 10 4R CM

-380 -400 -420 -440 -460

5R JB 20 -2-4 -6-8

6R NT 18 16 14 12 7R EF

Nano Seconds

TIME (HOURS)

16 18 20 22 1/00 1/02

0.1 0.0 -0.1

Delay vs UTC time for el031b.UVAVG.1 SN 2 Lpol IF 1

Plot file version 3 created 03-DEC-2003 08:47:31

2L ON 14 12 10 8 3L MH 0 -5 -10 4L CM -8 -10 -12 -14 5L JB 10 5 0 -5 6L NT 10 8 6 4 7L EF

Nano Seconds

TIME (HOURS)

16 18 20 22 1/00 1/02

0.1 0.0 -0.1

Delay vs UTC time for el031b.UVAVG.1 SN 2 Lpol IF 2

Plot file version 4 created 03-DEC-2003 08:47:31

2L ON 15 10 5 3L MH 25 20 4L CM

-400 -450 -500 -550 5L JB 6 4 2 0 -2 -4 6L NT 25 20 7L EF

Nano Seconds

TIME (HOURS)

16 18 20 22 1/00 1/02

0.1 0.0 -0.1