Gain amp vs UTC time for el031b.TMP.1 CL 4 Lpol IF 1

Plot file version 1 created 03-DEC-2003 10:53:16

3L MH

0.88 0.87 0.86 0.85

4L CM

5L JB

0.050 0.048 0.046 0.044

6L NT

0.800 0.798 0.796 0.794

7L EF

Kilo Gain

TIME (HOURS)

16 18 20 22 1/00 1/02

0.03 0.02 0.01

Gain amp vs UTC time for el031b.TMP.1 CL 4 Lpol IF 2

Plot file version 2 created 03-DEC-2003 10:53:16

4L CM

6L NT

1.52 1.51 1.50

7L EF

Kilo Gain

TIME (HOURS)

16 18 20 22 1/00 1/02

0.04 0.03 0.02 0.01