Tsys vs UTC time for el031b.UVAVG.1 TY 1 Rpol IF 1 - 2

Plot file version 1 created 03-DEC-2003 08:37:04

1R MC IF 1 440 420 400 380 360 1R MC IF 2 450 400 350 2R ON IF 1 200 180 160 140 2R ON IF 2 220 200 180 160 3R MH IF 1 200 180 160 140 3R MH IF 2

Kelvin

200 180 160 140 4R CM IF 1

1.005 1.000 0.995

4R CM IF 2

1.005 1.000 0.995

5R JB IF 1 300 250 200 5R JB IF 2

TIME (HOURS)

16 18 20 22 1/00 1/02

300 250 200

Tsys vs UTC time for el031b.UVAVG.1 TY 1 Rpol IF 1 - 2

Plot file version 2 created 03-DEC-2003 08:37:04

6R NT IF 1 160 140 120 100 6R NT IF 2 180 160 140 120 7R EF IF 1

220200 180160 140120

7R EF IF 2

Kelvin

TIME (HOURS)

16 18 20 22 1/00 1/02 200 150

Tsys vs UTC time for el031b.UVAVG.1 TY 1 Lpol IF 1 - 2

Plot file version 3 created 03-DEC-2003 08:37:04

1L MC IF 1 500 480 460 440 420 1L MC IF 2 520 500 480 460 440 420 2L ON IF 1 200 180 160 140 2L ON IF 2 220 200 180 160 3L MH IF 1 150 140 130 120 110 3L MH IF 2

Kelvin

150 140 130 120 110 4L CM IF 1

1.005 1.000 0.995

4L CM IF 2

1.005 1.000 0.995

5L JB IF 1 200 150 100 5L JB IF 2

TIME (HOURS)

16 18 20 22 1/00 1/02

200 150 100

Tsys vs UTC time for el031b.UVAVG.1 TY 1 Lpol IF 1 - 2

Plot file version 4 created 03-DEC-2003 08:37:04

6L NT IF 1 240 220 200 180 160 6L NT IF 2

260240 220 200180 160 7L EF IF 1 200 150 7L EF IF 2

Kelvin

TIME (HOURS)

16 18 20 22 1/00 1/02

250 200 150