Center at RA 05 55 30.80561 DEC 39 48 49.1650

CONT: DA193 IPOL 6667.360 MHZ DA193.IIM001.2

PLot file version 1 created 06-APR-2005 10:46:13

Cont peak flux = 5.2816E+00 JY/BEAM Levs = 5.282E+00 * (-0.321, 0.321, 0.642)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100