Center at RA 02 44 57.69683 DEC 62 28 06.5146

CONT: J0244+62 IPOL 6668.690 MHZ J0244+6228.IIM001.2

PLot file version 1 created 06-APR-2005 13:10:31

Cont peak flux = 7.4314E-01 JY/BEAM Levs = 7.431E-01 * (-0.243, 0.243, 0.486, 0.972)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100