Delay vs UTC time for el032_12.UVAVG.1 SN 2 Rpol & Lpol IF 1

Plot file version 1 created 06-APR-2005 14:46:03

1R MC

-0.030 -0.032 -0.034 -0.036 1L MC -0.015 -0.020 -0.025 2R ON

0.020 0.015 0.010 2L ON

0.040 0.035 0.030 3R TR

0.070 0.068 0.066 3L TR

MicroSeconds

0.094 0.092 0.090 4R CM -0.088 -0.090 -0.092 4L CM

-0.068 -0.070 -0.072 -0.074 5R DA 0 -1 -2 -3 5L DA

TIME (HOURS)

15 16 17 18 19 20

0.055 0.050 0.045

Delay vs UTC time for el032_12.UVAVG.1 SN 2 Rpol & Lpol IF 1

Plot file version 2 created 06-APR-2005 14:46:03

6R NT

0.058 0.056 0.054 0.052 0.050 0.048 6L NT

0.096 0.094 0.092 0.090

7R EF

0.000

7L EF

0.000

8R WB

0.070

0.065

0.060

8L WB

MicroSeconds

TIME (HOURS)

15 16 17 18 19 20

0.088 0.086 0.084 0.082 0.080 0.078

Delay vs UTC time for el032_12.UVAVG.1 SN 2 Rpol & Lpol IF 1

Plot file version 1 created 06-APR-2005 15:37:40

1R MC

-0.030 -0.032 -0.034 -0.036 1L MC -0.015 -0.020 -0.025 2R ON

0.020 0.015 0.010 2L ON

0.040 0.035 0.030 3R TR

0.070 0.068 0.066 3L TR

MicroSeconds

0.094 0.092 0.090 4R CM -0.088 -0.090 -0.092 4L CM

-0.068 -0.070 -0.072 -0.074 5R DA 0 -1 -2 -3 5L DA

TIME (HOURS)

15 16 17 18 19 20

0.055 0.050 0.045

Delay vs UTC time for el032_12.UVAVG.1 SN 2 Rpol & Lpol IF 1

Plot file version 2 created 06-APR-2005 15:37:40

6R NT

0.058 0.056 0.054 0.052 0.050 0.048 6L NT

0.096

0.094

0.092

0.090 7R EF

0.000

7L EF

0.000

8R WB

0.070

0.065

0.060

8L WB

MicroSeconds

TIME (HOURS)

15 16 17 18 19 20

0.088 0.086 0.084 0.082 0.080 0.078