Center at RA 23 02 41.31520 DEC 64 05 52.8512

CONT: J2302+64 IPOL 6667.730 MHZ J2302+6405.ICL001.5

PLot file version 1 created 29-MAR-2005 19:05:58

Cont peak flux = 1.8109E-01 JY/BEAM Levs = 1.811E-01 * (-0.019, 0.019, 0.038, 0.076, 0.152, 0.303, 0.607)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100