Gain amp vs UTC time for 3C454.3.MULTI.1 SN 2 Rpol & Lpol IF 1

Plot file version 1 created 01-APR-2005 14:26:20

1R MC 0.6 0.5 0.4 2R ON

0.780 0.775 0.770 0.765

2L ON 0.850 0.845 0.840 0.835 3R TR

1.210 1.205 1.200 1.195

3L TR 0.585 0.580 0.575 0.570 4R CM

Gain

0.790 0.785 0.780 0.775 4L CM

0.670 0.665 0.660 0.655

5L DA

1.055 1.050 1.045 1.040

6R NT

0.705 0.700 0.695 0.690

6L NT

TIME (HOURS)

16 49 15 30 45 50 00 15 30 45 51 00

0.815 0.810 0.805 0.800

Gain amp vs UTC time for 3C454.3.MULTI.1 SN 2 Rpol & Lpol IF 1

Plot file version 2 created 01-APR-2005 14:26:20

7R EF

1.430 1.425 1.420 1.415 7L EF

1.235 1.230 1.225 1.220

8R WB 0.565 0.560 0.555 0.550 8L WB

Gain

TIME (HOURS)

16 49 15 30 45 50 00 15 30 45 51 00

1.125 1.120 1.115 1.110