Gain phs vs UTC time for 3C454.3.MULTI.1 SN 1 Rpol & Lpol IF 1

Plot file version 1 created 01-APR-2005 14:26:16

1R MC

-1.370 -1.375 -1.380 -1.385

1L MC 6 4 2 2R ON 100 50 0 2L ON

-13.535 -13.540 -13.545 -13.550 3R TR

18.560 18.555 18.550 18.545

3L TR

Degrees

-8.755 -8.760 -8.765 -8.770

4R CM

7.890 7.885 7.880 7.875

4L CM -5.070 -5.075 -5.080 -5.085

5R DA

0.270 0.265 0.260 0.255

5L DA

TIME (HOURS)

16 48 30 49 00 30 50 00 30 51 00

-4.505 -4.510 -4.515 -4.520

Gain phs vs UTC time for 3C454.3.MULTI.1 SN 1 Rpol & Lpol IF 1

Plot file version 2 created 01-APR-2005 14:26:16

6R NT

4.055 4.050 4.045 4.040

6L NT 2.280 2.275 2.270 2.265 7R EF

0.010 0.005 0.000 -0.005

7L EF

0.010 0.005 0.000 -0.005

8R WB

4.700 4.695 4.690 4.685

8L WB

Degrees

TIME (HOURS)

16 48 30 49 00 30 50 00 30 51 00

-1.520 -1.525 -1.530 -1.535