Center at RA 20 07 44.94485 DEC 40 29 48.6041

CONT: J2007+40 IPOL 6667.700 MHZ J2007+4029.ICL001.5

PLot file version 1 created 04-APR-2005 12:08:12

Cont peak flux = 1.7702E+00 JY/BEAM Levs = 1.770E+00 * (-0.021, 0.021, 0.043, 0.085, 0.171, 0.341, 0.682)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100