Center at RA 14 43 02.78490 DEC 52 01 36.8570

CONT: 3C303 IPOL 4989.302 MHZ 3C303.ICL001.1

PLot file version 1 created 07-FEB-2006 16:13:46

Cont peak flux = 2.3864E-01 JY/BEAM Levs = 2.386E-03 * (-2.44, 2.444, 4.887, 9.774, 19.55, 39.10, 78.19)

MilliARC SEC

MilliARC SEC

80 60 40 20 0 -20 -40 -60 -80

80

60

40

20

0

-20

-40

-60

-80