Center at RA 14 19 59.29709 DEC 27 06 25.5529

CONT: J1419+27 IPOL 4989.302 MHZ J1419+2706.ICL001.3

PLot file version 1 created 07-FEB-2006 16:18:46

Cont peak flux = 3.9483E-01 JY/BEAM Levs = 3.948E-03 * (-0.795, 0.795, 1.591, 3.182, 6.364, 12.73, 25.45, 50.91)

MilliARC SEC

MilliARC SEC

80 60 40 20 0 -20 -40 -60 -80

80

60

40

20

0

-20

-40

-60

-80