Center at RA 17 13 35.14761 DEC 49 16 32.5366

CONT: J1713+49 IPOL 4989.302 MHZ J1713+4916.ICL001.1

PLot file version 1 created 07-FEB-2006 16:14:25

Cont peak flux = 1.4600E-01 JY/BEAM Levs = 1.460E-03 * (-2.83, 2.827, 5.655, 11.31, 22.62, 45.24, 90.48)

MilliARC SEC

MilliARC SEC

80 60 40 20 0 -20 -40 -60 -80

80

60

40

20

0

-20

-40

-60

-80