Center at RA 14 07 00.39441 DEC 28 27 14.6902

CONT: MKN668 IPOL 4989.302 MHZ MKN668.IIM001.1

PLot file version 1 created 07-FEB-2006 16:14:28

Cont peak flux = 1.6472E+00 JY/BEAM Levs = 1.647E-02 * (-15.8, 15.82, 31.64, 63.28)

MilliARC SEC

MilliARC SEC

80 60 40 20 0 -20 -40 -60 -80

80

60

40

20

0

-20

-40

-60

-80