Center at RA 14 07 00.39441 DEC 28 27 14.6900

CONT: OQ208 IPOL 8420.302 MHZ OQ208.ICL001.3

PLot file version 1 created 13-AUG-2002 15:23:46

Cont peak flux = 1.4149E+00 JY/BEAM Levs = 1.415E+00 * (-0.013, 0.013, 0.026, 0.053, 0.105, 0.211, 0.422, 0.843)

MilliARC SEC

MilliARC SEC

40 20 0 -20 -40

50

40

30

20

10

0

-10

-20

-30

-40

-50