Center at RA 08 43 31.63740 DEC 42 15 29.5255

CONT: 0840+424 IPOL 1663.771 MHZ 0840+424.ICL001.3

PLot file version 1 created 10-JUN-2002 17:49:09

Cont peak flux = 1.1060E+00 JY/BEAM Levs = 1.106E+00 * (-0.004, 0.004, 0.008, 0.016, 0.032, 0.065, 0.130, 0.259, 0.518)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250